
\section{Parameters} 


\parskip = 0pt

\setlength{\tableWidth}{160mm}

\setlength{\paraWidth}{\tableWidth}
\setlength{\descWidth}{\tableWidth}
\settowidth{\maxVarWidth}{enable\_illinoisgrmhd\_staggered\_a\_fields}

\addtolength{\paraWidth}{-\maxVarWidth}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}

\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{a\_b} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Magnetic field strength parameter.}} \\
\hline{\bf Range} & &  {\bf Default:} 1e-3 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{Any real} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{afield\_type} & {\bf Scope:} restricted & KEYWORD \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em A-field prescription}} \\
\hline{\bf Range} & &  {\bf Default:} TOV\_pressure\_prescription \\\multicolumn{1}{|p{\maxVarWidth}|}{see [1] below} & \multicolumn{2}{p{\paraWidth}|}{A\_phi propto (P - P\_cut)\^n\_s} \\\multicolumn{1}{|p{\maxVarWidth}|}{see [1] below} & \multicolumn{2}{p{\paraWidth}|}{A\_phi propto rho} \\\multicolumn{1}{|p{\maxVarWidth}|}{see [1] below} & \multicolumn{2}{p{\paraWidth}|}{Dipole magnetic field, interior to the star} \\\multicolumn{1}{|p{\maxVarWidth}|}{see [1] below} & \multicolumn{2}{p{\paraWidth}|}{Dipole magnetic field everywhere} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent {\bf [1]} \noindent \begin{verbatim}TOV\_pressure\_prescription\end{verbatim}\noindent {\bf [1]} \noindent \begin{verbatim}TOV\_density\_prescription\end{verbatim}\noindent {\bf [1]} \noindent \begin{verbatim}BNS\_poloidal\_A\_interior\end{verbatim}\noindent {\bf [1]} \noindent \begin{verbatim}BNS\_dipolar\_A\_everywhere\end{verbatim}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{enable\_illinoisgrmhd\_staggered\_a\_fields} & {\bf Scope:} restricted & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Define A fields on an IllinoisGRMHD staggered grid}} \\
\hline & & {\bf Default:} yes \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{enable\_varpi\_squared\_multiplication} & {\bf Scope:} restricted & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Multiply A\_phi by varpi\^2?}} \\
\hline & & {\bf Default:} yes \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{have\_two\_nss\_along\_x\_axis} & {\bf Scope:} restricted & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Do we have two NSs centered along x-axis?}} \\
\hline & & {\bf Default:} no \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{i\_zero\_ns1} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Magnetic field loop current of NS1.}} \\
\hline{\bf Range} & &  {\bf Default:} 0.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0.0:*)} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{i\_zero\_ns2} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Magnetic field loop current of NS2.}} \\
\hline{\bf Range} & &  {\bf Default:} 0.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0.0:*)} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{n\_s} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Magnetic field strength pressure exponent.}} \\
\hline{\bf Range} & &  {\bf Default:} 1.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{Any real} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{p\_cut} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Cutoff pressure, below which vector potential is set to zero. Typically set to 4\% of the maximum initial pressure.}} \\
\hline{\bf Range} & &  {\bf Default:} 1e-5 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{Positive} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{r\_ns1} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Radius of NS1. Does not have to be perfect, but must not overlap other star.}} \\
\hline{\bf Range} & &  {\bf Default:} 13.5 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{Any positive} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{r\_ns2} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Radius of NS2. Does not have to be perfect, but must not overlap other star.}} \\
\hline{\bf Range} & &  {\bf Default:} 13.5 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{Any positive} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{r\_zero\_ns1} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Current loop radius of NS1.}} \\
\hline{\bf Range} & &  {\bf Default:} 1.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0.0:*)} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{r\_zero\_ns2} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Current loop radius of NS2.}} \\
\hline{\bf Range} & &  {\bf Default:} 1.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0.0:*)} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{rho\_cut} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Cutoff density, below which vector potential is set to zero. Typically set to 20\% of the maximum initial density.}} \\
\hline{\bf Range} & &  {\bf Default:} 0.2 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{Positive} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{x\_c1} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em x coordinate of NS1 center}} \\
\hline{\bf Range} & &  {\bf Default:} -15.2 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{Any real} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{x\_c2} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em x coordinate of NS2 center}} \\
\hline{\bf Range} & &  {\bf Default:} 15.2 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{Any real} \\\hline
\end{tabular*}

\vspace{0.5cm}\parskip = 10pt 
