
\section{Parameters} 


\parskip = 0pt

\setlength{\tableWidth}{160mm}

\setlength{\paraWidth}{\tableWidth}
\setlength{\descWidth}{\tableWidth}
\settowidth{\maxVarWidth}{FishboneMoncriefID}

\addtolength{\paraWidth}{-\maxVarWidth}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}

\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{random\_max} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Ceiling value of random perturbation to initial pressure, where perturbed pressure = pressure*(1.0 + (random\_min + (random\_max-random\_min)*RAND[0,1)))}} \\
\hline{\bf Range} & &  {\bf Default:} 0.02 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{Any value} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{random\_min} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Floor value of random perturbation to initial pressure, where perturbed pressure = pressure*(1.0 + (random\_min + (random\_max-random\_min)*RAND[0,1)))}} \\
\hline{\bf Range} & &  {\bf Default:} -0.02 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{Any value} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{a} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em The spin parameter of the black hole}} \\
\hline{\bf Range} & &  {\bf Default:} 0.9375 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:1.0} & \multicolumn{2}{p{\paraWidth}|}{Positive values, up to 1. Negative disallowed, as certain roots are chosen in the hydro fields setup. Check those before enabling negative spins!} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{a\_b} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Scaling factor for the vector potential}} \\
\hline{\bf Range} & &  {\bf Default:} 1.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{gamma} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Equation of state: P = kappa * rho\^gamma}} \\
\hline{\bf Range} & &  {\bf Default:} 1.3333333333333333333333333333 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0.0:*} & \multicolumn{2}{p{\paraWidth}|}{Positive values} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{kappa} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Equation of state: P = kappa * rho\^gamma}} \\
\hline{\bf Range} & &  {\bf Default:} 1.0e-3 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0.0:*} & \multicolumn{2}{p{\paraWidth}|}{Positive values} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{m} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Kerr-Schild BH mass. Probably should always set M=1.}} \\
\hline{\bf Range} & &  {\bf Default:} 1.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0.0:*} & \multicolumn{2}{p{\paraWidth}|}{Must be positive} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{r\_at\_max\_density} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Radius at maximum disk density. Needs to be {\textgreater} r\_in}} \\
\hline{\bf Range} & &  {\bf Default:} 12.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0.0:*} & \multicolumn{2}{p{\paraWidth}|}{Must be positive} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{r\_in} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Fixes the inner edge of the disk}} \\
\hline{\bf Range} & &  {\bf Default:} 6.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0.0:*} & \multicolumn{2}{p{\paraWidth}|}{Must be positive} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{initial\_hydro} & {\bf Scope:} shared from HYDROBASE & KEYWORD \\\hline
\multicolumn{3}{|l|}{\bf Extends ranges:}\\ 
\hline\multicolumn{1}{|p{\maxVarWidth}|}{\centering FishboneMoncriefID} & \multicolumn{2}{p{\paraWidth}|}{Initial GRHD data from FishboneMoncriefID solution} \\\hline
\end{tabular*}

\vspace{0.5cm}\parskip = 10pt 
