
\section{Schedule} 


\parskip = 0pt


\noindent This section lists all the variables which are assigned storage by thorn PITTNullCode/NullPsiInt.  Storage can either last for the duration of the run ({\bf Always} means that if this thorn is activated storage will be assigned, {\bf Conditional} means that if this thorn is activated storage will be assigned for the duration of the run if some condition is met), or can be turned on for the duration of a schedule function.


\subsection*{Storage}

\hspace{5mm}

 \begin{tabular*}{160mm}{ll} 

{\bf Always:}&  ~ \\ 
 NewsB\_mask Psi4\_mask NewsB\_Psi re\_dotNewsB[2] im\_dotNewsB[2] re\_PsiInt[2] im\_PsiInt[2] & ~\\ 
~ & ~\\ 
\end{tabular*} 


\subsection*{Scheduled Functions}
\vspace{5mm}

\noindent {\bf NullEvol\_Initial} 

\hspace{5mm} nullpsiint\_initmol 

\hspace{5mm}{\it initial data } 


\hspace{5mm}

 \begin{tabular*}{160mm}{cll} 
~ & After:  & nullevol\_initialslice \\ 
~ & Language:  & fortran \\ 
~ & Options:  & global \\ 
~ & Type:  & function \\ 
\end{tabular*} 


\vspace{5mm}

\noindent {\bf MoL\_Register} 

\hspace{5mm} nullpsiint\_molregister 

\hspace{5mm}{\it register variables for mol } 


\hspace{5mm}

 \begin{tabular*}{160mm}{cll} 
~ & Language:  & c \\ 
~ & Type:  & function \\ 
\end{tabular*} 


\vspace{5mm}

\noindent {\bf MoL\_CalcRHS} 

\hspace{5mm} nullpsiint\_dotnewspsi 

\hspace{5mm}{\it calculate the integral of psi4 } 


\hspace{5mm}

 \begin{tabular*}{160mm}{cll} 
~ & Language:  & fortran \\ 
~ & Sync:  & newsb\_psi \\ 
~ & Type:  & function \\ 
\end{tabular*} 



\vspace{5mm}\parskip = 10pt 
