
\section{Parameters} 


\parskip = 0pt

\setlength{\tableWidth}{160mm}

\setlength{\paraWidth}{\tableWidth}
\setlength{\descWidth}{\tableWidth}
\settowidth{\maxVarWidth}{nullpsiint\_maxevolvedarraysize}

\addtolength{\paraWidth}{-\maxVarWidth}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}

\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{mask\_type} & {\bf Scope:} private & KEYWORD \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em type of mask for error in J}} \\
\hline{\bf Range} & &  {\bf Default:} none \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering none} & \multicolumn{2}{p{\paraWidth}|}{no mask} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering EG\_mask} & \multicolumn{2}{p{\paraWidth}|}{mask all the active points} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering EV\_mask} & \multicolumn{2}{p{\paraWidth}|}{mask only the evolution points} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering EQ\_mask} & \multicolumn{2}{p{\paraWidth}|}{mask only the equator points} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{nullpsiint\_maxevolvedarraysize} & {\bf Scope:} restricted & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em The maximum size of evolved grid arrays used by NullPsiInt}} \\
\hline{\bf Range} & &  {\bf Default:} 1 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 1:*} & \multicolumn{2}{p{\paraWidth}|}{The size of the generator grid arrays} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{nullpsiint\_numarrayevolvedvars} & {\bf Scope:} restricted & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em The maximum number of evolved grid arrays used by NullPsiInt}} \\
\hline{\bf Range} & &  {\bf Default:} 4 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 4:4} & \multicolumn{2}{p{\paraWidth}|}{Is is the real and imaginary part of the RHS (Psi) and the News obtained by integrating Psi} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{n\_ang\_ev\_outside\_eq} & {\bf Scope:} shared from NULLGRID & INT \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{n\_ang\_ghost\_pts} & {\bf Scope:} shared from NULLGRID & INT \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{n\_ang\_pts\_inside\_eq} & {\bf Scope:} shared from NULLGRID & INT \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{n\_ang\_stencil\_size} & {\bf Scope:} shared from NULLGRID & INT \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{n\_radial\_pts} & {\bf Scope:} shared from NULLGRID & INT \\\hline
\end{tabular*}

\vspace{0.5cm}\parskip = 10pt 
