
\section{Parameters} 


\parskip = 0pt

\setlength{\tableWidth}{160mm}

\setlength{\paraWidth}{\tableWidth}
\setlength{\descWidth}{\tableWidth}
\settowidth{\maxVarWidth}{log\_interp\_coords}

\addtolength{\paraWidth}{-\maxVarWidth}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}

\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{log\_interp\_coords} & {\bf Scope:} private & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em should we log the grid min(delta)max and the interpolation		   coordinates for each call on the interpolator?}} \\
\hline & & {\bf Default:} false \\\hline
\end{tabular*}

\vspace{0.5cm}\parskip = 10pt 
