
\section{Parameters} 


\parskip = 0pt

\setlength{\tableWidth}{160mm}

\setlength{\paraWidth}{\tableWidth}
\setlength{\descWidth}{\tableWidth}
\settowidth{\maxVarWidth}{calculate\_np\_every}

\addtolength{\paraWidth}{-\maxVarWidth}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}

\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{calculate\_np\_every} & {\bf Scope:} private & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Calculate NP scalars every N iterations}} \\
\hline{\bf Range} & &  {\bf Default:} 1 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{0 or negative is never} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{np\_order} & {\bf Scope:} private & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Second or fourth order accuracy?}} \\
\hline{\bf Range} & &  {\bf Default:} 4 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 2} & \multicolumn{2}{p{\paraWidth}|}{Second order} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 4} & \multicolumn{2}{p{\paraWidth}|}{Fourth order} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 6} & \multicolumn{2}{p{\paraWidth}|}{Sixth  order} \\\hline
\end{tabular*}

\vspace{0.5cm}\parskip = 10pt 
