
\section{Parameters} 


\parskip = 0pt

\setlength{\tableWidth}{160mm}

\setlength{\paraWidth}{\tableWidth}
\setlength{\descWidth}{\tableWidth}
\settowidth{\maxVarWidth}{tovola\_max\_interpolation\_stencil}

\addtolength{\paraWidth}{-\maxVarWidth}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}

\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{tovola\_absolute\_max\_step} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Biggest possible step size.}} \\
\hline{\bf Range} & &  {\bf Default:} 1.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering (0.0:*} & \multicolumn{2}{p{\paraWidth}|}{Must be positive} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{tovola\_absolute\_min\_step} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Smallest possible step size}} \\
\hline{\bf Range} & &  {\bf Default:} 1.0e-20 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering (0.0:*} & \multicolumn{2}{p{\paraWidth}|}{Must be positive} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{tovola\_central\_baryon\_density} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em What's the initial baryon density? (Used to calculate initial pressure).}} \\
\hline{\bf Range} & &  {\bf Default:} 0.125 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering (0.0:*} & \multicolumn{2}{p{\paraWidth}|}{Must be Positive} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{tovola\_eos\_type} & {\bf Scope:} private & KEYWORD \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em What EOS type are you using?}} \\
\hline{\bf Range} & &  {\bf Default:} Simple \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering Simple} & \multicolumn{2}{p{\paraWidth}|}{Simple Polytrope} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering Piecewise} & \multicolumn{2}{p{\paraWidth}|}{Piecewise Polytrope} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering Tabulated} & \multicolumn{2}{p{\paraWidth}|}{Tabulated EOS} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{tovola\_error\_limit} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Limiting factor of the error. Determines GSL's Tolerance.}} \\
\hline{\bf Range} & &  {\bf Default:} 1.0e-8 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering (0.0:*} & \multicolumn{2}{p{\paraWidth}|}{Must be Positive} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{tovola\_initial\_ode\_step\_size} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Initial Step Size}} \\
\hline{\bf Range} & &  {\bf Default:} 1.0e-20 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering (0.0:*} & \multicolumn{2}{p{\paraWidth}|}{Must be Positive} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{tovola\_interpolation\_stencil} & {\bf Scope:} private & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Stencil Size for Interpollator to Grid}} \\
\hline{\bf Range} & &  {\bf Default:} 11 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 1:*} & \multicolumn{2}{p{\paraWidth}|}{Minimum stencil of 1} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{tovola\_max\_interpolation\_stencil} & {\bf Scope:} private & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Maximum Interpollator stencil}} \\
\hline{\bf Range} & &  {\bf Default:} 13 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 1:*} & \multicolumn{2}{p{\paraWidth}|}{Minimum stencil of 1} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{tovola\_ode\_method} & {\bf Scope:} private & KEYWORD \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em What type of ODE method are we using (More Methods can be added if there is demand)}} \\
\hline{\bf Range} & &  {\bf Default:} ARKF \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering ARKF} & \multicolumn{2}{p{\paraWidth}|}{"Adaptive Runge-Kutta-Fehlberg 
 (RK4(5))"} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering ADP8} & \multicolumn{2}{p{\paraWidth}|}{Adaptive Dormand-Prince Eigth Order (DP7(8))} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{tovola\_size} & {\bf Scope:} private & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Maximum number of steps}} \\
\hline{\bf Range} & &  {\bf Default:} 10000000 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 1:*} & \multicolumn{2}{p{\paraWidth}|}{Minimum of 1 step} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{tovola\_tin} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Beta Equilibrium Temperature}} \\
\hline{\bf Range} & &  {\bf Default:} 1.0e-2 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering (0.0:*} & \multicolumn{2}{p{\paraWidth}|}{Must be Positive} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{tovola\_tov\_populate\_timelevels} & {\bf Scope:} private & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Populate that amount of timelevels}} \\
\hline{\bf Range} & &  {\bf Default:} 1 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 1:3} & \multicolumn{2}{p{\paraWidth}|}{1 (default) to 3} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{initial\_hydro} & {\bf Scope:} shared from HYDROBASE & KEYWORD \\\hline
\multicolumn{3}{|l|}{\bf Extends ranges:}\\ 
\hline\multicolumn{1}{|p{\maxVarWidth}|}{\centering TOVola} & \multicolumn{2}{p{\paraWidth}|}{TOV star initial hydrobase variables} \\\hline
\end{tabular*}

\vspace{0.5cm}\parskip = 10pt 
