
\section{Parameters} 


\parskip = 0pt

\setlength{\tableWidth}{160mm}

\setlength{\paraWidth}{\tableWidth}
\setlength{\descWidth}{\tableWidth}
\settowidth{\maxVarWidth}{constantdensitysphere\_sphere\_radius}

\addtolength{\paraWidth}{-\maxVarWidth}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}

\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{beq\_temperature} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Temperature used to impose beta-equilibrium}} \\
\hline{\bf Range} & &  {\bf Default:} -1 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{Non-negative values} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering -1} & \multicolumn{2}{p{\paraWidth}|}{Forbidden value} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{constantdensitysphere\_rho\_exterior} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Exterior density in geometrized units}} \\
\hline{\bf Range} & &  {\bf Default:} -1 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{Non-negative values} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering -1} & \multicolumn{2}{p{\paraWidth}|}{Forbidden value} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{constantdensitysphere\_rho\_interior} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Interior density in geometrized units}} \\
\hline{\bf Range} & &  {\bf Default:} -1 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{Non-negative values} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering -1} & \multicolumn{2}{p{\paraWidth}|}{Forbidden value} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{constantdensitysphere\_sphere\_radius} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Sphere radius in geometrized units}} \\
\hline{\bf Range} & &  {\bf Default:} -1 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{Non-negative values} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering -1} & \multicolumn{2}{p{\paraWidth}|}{Forbidden value} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{constantdensitysphere\_t\_exterior} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Exterior temperature in MeV}} \\
\hline{\bf Range} & &  {\bf Default:} -1 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{Non-negative values} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering -1} & \multicolumn{2}{p{\paraWidth}|}{Forbidden value} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{constantdensitysphere\_t\_interior} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Interior temperature in MeV}} \\
\hline{\bf Range} & &  {\bf Default:} -1 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{Non-negative values} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering -1} & \multicolumn{2}{p{\paraWidth}|}{Forbidden value} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{constantdensitysphere\_vx\_interior} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Interior x-velocity}} \\
\hline{\bf Range} & &  {\bf Default:} (none) \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{Anything goes} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{constantdensitysphere\_vy\_interior} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Interior y-velocity}} \\
\hline{\bf Range} & &  {\bf Default:} (none) \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{Anything goes} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{constantdensitysphere\_vz\_interior} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Interior z-velocity}} \\
\hline{\bf Range} & &  {\bf Default:} (none) \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{Anything goes} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{constantdensitysphere\_y\_e\_exterior} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Exterior electron fraction (dimensionless)}} \\
\hline{\bf Range} & &  {\bf Default:} -1 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{Non-negative values} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering -1} & \multicolumn{2}{p{\paraWidth}|}{Forbidden value} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{constantdensitysphere\_y\_e\_interior} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Interior electron fraction (dimensionless)}} \\
\hline{\bf Range} & &  {\bf Default:} -1 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{Non-negative values} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering -1} & \multicolumn{2}{p{\paraWidth}|}{Forbidden value} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{discontinuity\_position} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Set location of the shock discontinuity}} \\
\hline{\bf Range} & &  {\bf Default:} 0.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{impose\_beta\_equilibrium} & {\bf Scope:} restricted & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Impose beta-equilibrium on initial data}} \\
\hline & & {\bf Default:} no \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{initial\_data\_1d} & {\bf Scope:} restricted & KEYWORD \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Set initial data type for 1D tests}} \\
\hline{\bf Range} & &  {\bf Default:} Balsara1 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering equilibrium} & \multicolumn{2}{p{\paraWidth}|}{initial data for the equilibrium test} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering sound wave} & \multicolumn{2}{p{\paraWidth}|}{initial data for the sound wave test} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering shock tube} & \multicolumn{2}{p{\paraWidth}|}{initial data for the shock tube test} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering Balsara1} & \multicolumn{2}{p{\paraWidth}|}{initial data for the Balsara1 test} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering Balsara2} & \multicolumn{2}{p{\paraWidth}|}{initial data for the Balsara2 test} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering Balsara3} & \multicolumn{2}{p{\paraWidth}|}{initial data for the Balsara3 test} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering Balsara4} & \multicolumn{2}{p{\paraWidth}|}{initial data for the Balsara4 test} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering Balsara5} & \multicolumn{2}{p{\paraWidth}|}{initial data for the Balsara5 test} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{initialize\_magnetic\_quantities} & {\bf Scope:} restricted & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Set whether Avec should be initialized}} \\
\hline & & {\bf Default:} yes \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{isotropicgas\_rho} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Gas density in geometrized units}} \\
\hline{\bf Range} & &  {\bf Default:} -1 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{Non-negative values} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering -1} & \multicolumn{2}{p{\paraWidth}|}{Forbidden value} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{isotropicgas\_temperature} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Gas temperature in MeV}} \\
\hline{\bf Range} & &  {\bf Default:} -1 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{Non-negative values} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering -1} & \multicolumn{2}{p{\paraWidth}|}{Forbidden value} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{isotropicgas\_y\_e} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Gas electron fraction (dimensionless)}} \\
\hline{\bf Range} & &  {\bf Default:} -1 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{Non-negative values} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering -1} & \multicolumn{2}{p{\paraWidth}|}{Forbidden value} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{shock\_direction} & {\bf Scope:} restricted & KEYWORD \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Set direction for shock in test data}} \\
\hline{\bf Range} & &  {\bf Default:} x \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering x} & \multicolumn{2}{p{\paraWidth}|}{Test data will have discontinuities along x direction} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering y} & \multicolumn{2}{p{\paraWidth}|}{Test data will have discontinuities along y direction} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering z} & \multicolumn{2}{p{\paraWidth}|}{Test data will have discontinuities along z direction} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{stagger\_a\_fields} & {\bf Scope:} restricted & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Sets whether Avec is staggered to +1/2 (following IllinoisGRMHD convention)}} \\
\hline & & {\bf Default:} yes \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{wave\_amplitude} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Wave amplitude for sound wave initial data}} \\
\hline{\bf Range} & &  {\bf Default:} 1.0e-3 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0.0:*} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{initial\_avec} & {\bf Scope:} shared from HYDROBASE & KEYWORD \\\hline
\multicolumn{3}{|l|}{\bf Extends ranges:}\\ 
\hline\multicolumn{1}{|p{\maxVarWidth}|}{\centering GRHayLID} & \multicolumn{2}{p{\paraWidth}|}{Initial vector potential set by GRHayLID} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{initial\_bvec} & {\bf Scope:} shared from HYDROBASE & KEYWORD \\\hline
\multicolumn{3}{|l|}{\bf Extends ranges:}\\ 
\hline\multicolumn{1}{|p{\maxVarWidth}|}{\centering GRHayLID} & \multicolumn{2}{p{\paraWidth}|}{Initial magnetic fields set by GRHayLID} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{initial\_entropy} & {\bf Scope:} shared from HYDROBASE & KEYWORD \\\hline
\multicolumn{3}{|l|}{\bf Extends ranges:}\\ 
\hline\multicolumn{1}{|p{\maxVarWidth}|}{\centering GRHayLID} & \multicolumn{2}{p{\paraWidth}|}{Initial entropy set by GRHayLID} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{initial\_hydro} & {\bf Scope:} shared from HYDROBASE & KEYWORD \\\hline
\multicolumn{3}{|l|}{\bf Extends ranges:}\\ 
\hline\multicolumn{1}{|p{\maxVarWidth}|}{\centering HydroTest1D} & \multicolumn{2}{p{\paraWidth}|}{"Initial data set by 1D test; see test\_1D\_initial\_data 
 parameter for options"} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering IsotropicGas} & \multicolumn{2}{p{\paraWidth}|}{Initial data set to isotropic gas} \\\multicolumn{1}{|p{\maxVarWidth}|}{see [1] below} & \multicolumn{2}{p{\paraWidth}|}{Initial data set to constant density sphere} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent {\bf [1]} \noindent \begin{verbatim}ConstantDensitySphere\end{verbatim}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{initial\_temperature} & {\bf Scope:} shared from HYDROBASE & KEYWORD \\\hline
\multicolumn{3}{|l|}{\bf Extends ranges:}\\ 
\hline\multicolumn{1}{|p{\maxVarWidth}|}{\centering GRHayLID} & \multicolumn{2}{p{\paraWidth}|}{Initial temperature set by GRHayLID} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{initial\_y\_e} & {\bf Scope:} shared from HYDROBASE & KEYWORD \\\hline
\multicolumn{3}{|l|}{\bf Extends ranges:}\\ 
\hline\multicolumn{1}{|p{\maxVarWidth}|}{\centering GRHayLID} & \multicolumn{2}{p{\paraWidth}|}{Initial Y\_e set by GRHayLID} \\\hline
\end{tabular*}

\vspace{0.5cm}\parskip = 10pt 
