
\section{Interfaces} 


\parskip = 0pt

\vspace{3mm} \subsection*{General}

\noindent {\bf Implements}: 

readinterpolate
\vspace{2mm}

\noindent {\bf Inherits}: 

grid
\vspace{2mm}
\subsection*{Grid Variables}
\vspace{5mm}\subsubsection{PRIVATE GROUPS}

\vspace{5mm}

\begin{tabular*}{150mm}{|c|c@{\extracolsep{\fill}}|rl|} \hline 
~ {\bf Group Names} ~ & ~ {\bf Variable Names} ~  &{\bf Details} ~ & ~\\ 
\hline 
reflevelseen & reflevelseen & compact & 0 \\ 
 &  & description & highest refinement level in source data that overlaps this point so far \\ 
 &  & dimensions & 3 \\ 
 &  & distribution & DEFAULT \\ 
 &  & group type & GF \\ 
 &  & tags & Checkpoint="no" Prolongation="none" \\ 
 &  & timelevels & 1 \\ 
 &  & vararray\_size & max\_number\_of\_read\_variables \\ 
 &  & variable type & INT \\ 
\hline 
interpthispoint & interpthispoint & compact & 0 \\ 
 &  & description & fill this point this time around \\ 
 &  & dimensions & 3 \\ 
 &  & distribution & DEFAULT \\ 
 &  & group type & GF \\ 
 &  & tags & Checkpoint="no" Prolongation="none" \\ 
 &  & timelevels & 1 \\ 
 &  & variable type & INT \\ 
\hline 
interp\_coords &  & compact & 0 \\ 
 & interp\_x & description & coordinate arrays for the interpolator \\ 
 & interp\_y & dimensions & 3 \\ 
 & interp\_z & distribution & DEFAULT \\ 
 & interp\_data & group type & GF \\ 
 &  & tags & Checkpoint="no" Prolongation="none" \\ 
 &  & timelevels & 1 \\ 
 &  & variable type & REAL \\ 
\hline 
test\_values & test\_values & compact & 0 \\ 
 &  & description & store values for test \\ 
 &  & dimensions & 3 \\ 
 &  & distribution & DEFAULT \\ 
 &  & group type & GF \\ 
 &  & tags & Checkpoint="yes" ProlongationOperator="none" \\ 
 &  & timelevels & 3 \\ 
 &  & variable type & REAL \\ 
\hline 
test\_results & test\_results & compact & 0 \\ 
 &  & description & difference values for test \\ 
 &  & dimensions & 3 \\ 
 &  & distribution & DEFAULT \\ 
 &  & group type & GF \\ 
 &  & tags & Checkpoint="no" ProlongationOperator="none" \\ 
 &  & timelevels & 1 \\ 
 &  & variable type & REAL \\ 
\hline 
\end{tabular*} 



\vspace{5mm}

\noindent {\bf Uses header}: 

carpet.hh
\vspace{2mm}\parskip = 10pt 
