
\section{Parameters} 


\parskip = 0pt

\setlength{\tableWidth}{160mm}

\setlength{\paraWidth}{\tableWidth}
\setlength{\descWidth}{\tableWidth}
\settowidth{\maxVarWidth}{conformally\_flat\_bbh\_puncture\_0\_bare\_mass}

\addtolength{\paraWidth}{-\maxVarWidth}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}

\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{cfl\_factor} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em CFL factor of the relaxation time evolution.}} \\
\hline{\bf Range} & &  {\bf Default:} 0.7 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:1} & \multicolumn{2}{p{\paraWidth}|}{Between zero and one. For higher resolutions this will have to be lowered.} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{conformally\_flat\_bbh\_puncture\_0\_bare\_mass} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Bare mass of first puncture}} \\
\hline{\bf Range} & &  {\bf Default:} 1e123 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{Must be positive} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 1e123} & \multicolumn{2}{p{\paraWidth}|}{Forbidden value to make sure it is explicitly set in the parfile} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{conformally\_flat\_bbh\_puncture\_0\_p} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Linear momentum of first puncture}} \\
\hline{\bf Range} & &  {\bf Default:} (none) \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{This parameter can have any value} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{conformally\_flat\_bbh\_puncture\_0\_pos} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Position of first puncture}} \\
\hline{\bf Range} & &  {\bf Default:} (none) \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{This parameter can have any value} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{conformally\_flat\_bbh\_puncture\_0\_s} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Angular momentum of first puncture}} \\
\hline{\bf Range} & &  {\bf Default:} (none) \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{This parameter can have any value} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{conformally\_flat\_bbh\_puncture\_1\_bare\_mass} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Bare mass of second puncture}} \\
\hline{\bf Range} & &  {\bf Default:} 1e123 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{Must be positive} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 1e123} & \multicolumn{2}{p{\paraWidth}|}{Forbidden value to make sure it is explicitly set in the parfile} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{conformally\_flat\_bbh\_puncture\_1\_p} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Linear momentum of second puncture}} \\
\hline{\bf Range} & &  {\bf Default:} (none) \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{This parameter can have any value} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{conformally\_flat\_bbh\_puncture\_1\_pos} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Position of second puncture}} \\
\hline{\bf Range} & &  {\bf Default:} (none) \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{This parameter can have any value} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{conformally\_flat\_bbh\_puncture\_1\_s} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Angular momentum of second puncture}} \\
\hline{\bf Range} & &  {\bf Default:} (none) \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{This parameter can have any value} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{domain\_size} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Domain size for the initial data}} \\
\hline{\bf Range} & &  {\bf Default:} 1e6 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{Must be positive} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{eta\_damping} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Wave equation damping parameter}} \\
\hline{\bf Range} & &  {\bf Default:} -1 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{Must be positive} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering -1} & \multicolumn{2}{p{\paraWidth}|}{Compute optimum eta\_damping (requires domain\_size=1e6; sinh\_width=0.07; foci\_position=5)} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{foci\_position} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Position of the foci of the prolate spheroidal coordinate system. Typically the position of the puncture.}} \\
\hline{\bf Range} & &  {\bf Default:} 5.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{Must be positive} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{info\_output\_freq} & {\bf Scope:} private & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Print progress of relaxation time evolution every info\_output\_freq iterations}} \\
\hline{\bf Range} & &  {\bf Default:} (none) \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{Any positive value. 0 disables it} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{initial\_data\_type} & {\bf Scope:} private & STRING \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Type of initial data generated by NRPyEllipticET}} \\
\hline{\bf Range} & &  {\bf Default:} ConformallyFlatBBH \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering ConformallyFlatBBH} & \multicolumn{2}{p{\paraWidth}|}{Conformally flat binary black hole initial data} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{interpolation\_order} & {\bf Scope:} private & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Interpolation order}} \\
\hline{\bf Range} & &  {\bf Default:} 4 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{Must be positive} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{interpolator\_name} & {\bf Scope:} private & STRING \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Interpolator name}} \\
\hline{\bf Range} & &  {\bf Default:} Lagrange polynomial interpolation \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering .+} & \multicolumn{2}{p{\paraWidth}|}{Can be anything} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{lapse\_exponent\_n} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Exponent of lapse initial data alpha = psi\^\{n\}}} \\
\hline{\bf Range} & &  {\bf Default:} -2 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{This parameter can have any value} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{log\_target\_residual} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Stopping criterion: log10(l2norm(residual))}} \\
\hline{\bf Range} & &  {\bf Default:} -16.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:0} & \multicolumn{2}{p{\paraWidth}|}{Should be negative, since we typically want small residuals} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{max\_iterations} & {\bf Scope:} private & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Maximum number of time steps in the relaxation time evolution.}} \\
\hline{\bf Range} & &  {\bf Default:} 10000 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{Must be positive} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{n0} & {\bf Scope:} private & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Number of points in the xx0 direction}} \\
\hline{\bf Range} & &  {\bf Default:} 128 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{Must be positive} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{n1} & {\bf Scope:} private & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Number of points in the xx1 direction}} \\
\hline{\bf Range} & &  {\bf Default:} 128 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{Must be positive} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{n2} & {\bf Scope:} private & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Number of points in the xx2 direction}} \\
\hline{\bf Range} & &  {\bf Default:} 16 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{Must be positive} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{nrpy\_epsilon} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Small number to avoid singularities at the punctures}} \\
\hline{\bf Range} & &  {\bf Default:} 1e-8 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{Can be anything} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{number\_of\_lct} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Number of light-crossing times}} \\
\hline{\bf Range} & &  {\bf Default:} 5.5e-6 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{Must be positive} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{orbital\_plane} & {\bf Scope:} private & STRING \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Orbital plane}} \\
\hline{\bf Range} & &  {\bf Default:} xy \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering xy} & \multicolumn{2}{p{\paraWidth}|}{Orbital plane is the xy-plane} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering yx} & \multicolumn{2}{p{\paraWidth}|}{Equivalent to xy} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering xz} & \multicolumn{2}{p{\paraWidth}|}{Orbital plane is the xz-plane} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering zx} & \multicolumn{2}{p{\paraWidth}|}{Equivalent to xz} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{position\_shift} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Shift punctures on the axis while keeping their distance fixed}} \\
\hline{\bf Range} & &  {\bf Default:} (none) \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{Can be anything} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{residual\_integration\_radius} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em The L2-norm of the residual is integrated in a sphere with this radius.}} \\
\hline{\bf Range} & &  {\bf Default:} 100.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{Must be positive; if set to {\textgreater}=domain\_size then will integrate over the entire NRPy+-generated grid.} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{sinh\_width} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em This parameter controls how densily sampled the regions near the punctures are. Smaller values ={\textgreater} higher resolution}} \\
\hline{\bf Range} & &  {\bf Default:} 0.07 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{Must be positive} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{verbose} & {\bf Scope:} private & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Whether or not to print information as the relaxation progresses}} \\
\hline & & {\bf Default:} no \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{initial\_data} & {\bf Scope:} shared from ADMBASE & KEYWORD \\\hline
\multicolumn{3}{|l|}{\bf Extends ranges:}\\ 
\hline\multicolumn{1}{|p{\maxVarWidth}|}{\centering NRPyEllipticET} & \multicolumn{2}{p{\paraWidth}|}{Initial data from NRPyEllipticET solution} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{initial\_dtlapse} & {\bf Scope:} shared from ADMBASE & KEYWORD \\\hline
\multicolumn{3}{|l|}{\bf Extends ranges:}\\ 
\hline\multicolumn{1}{|p{\maxVarWidth}|}{\centering NRPyEllipticET} & \multicolumn{2}{p{\paraWidth}|}{Initial dtlapse from NRPyEllipticET solution} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{initial\_dtshift} & {\bf Scope:} shared from ADMBASE & KEYWORD \\\hline
\multicolumn{3}{|l|}{\bf Extends ranges:}\\ 
\hline\multicolumn{1}{|p{\maxVarWidth}|}{\centering NRPyEllipticET} & \multicolumn{2}{p{\paraWidth}|}{Initial dtshift from NRPyEllipticET solution} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{initial\_lapse} & {\bf Scope:} shared from ADMBASE & KEYWORD \\\hline
\multicolumn{3}{|l|}{\bf Extends ranges:}\\ 
\hline\multicolumn{1}{|p{\maxVarWidth}|}{see [1] below} & \multicolumn{2}{p{\paraWidth}|}{Based on the initial conformal factor} \\\multicolumn{1}{|p{\maxVarWidth}|}{see [1] below} & \multicolumn{2}{p{\paraWidth}|}{Averaged lapse for two puncture black holes} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent {\bf [1]} \noindent \begin{verbatim}NRPyEllipticET-psi\^n\end{verbatim}\noindent {\bf [1]} \noindent \begin{verbatim}NRPyEllipticET-averaged\end{verbatim}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{initial\_shift} & {\bf Scope:} shared from ADMBASE & KEYWORD \\\hline
\multicolumn{3}{|l|}{\bf Extends ranges:}\\ 
\hline\multicolumn{1}{|p{\maxVarWidth}|}{\centering NRPyEllipticET} & \multicolumn{2}{p{\paraWidth}|}{Initial shift from NRPyEllipticET solution} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{lapse\_timelevels} & {\bf Scope:} shared from ADMBASE & INT \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{metric\_timelevels} & {\bf Scope:} shared from ADMBASE & INT \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{shift\_timelevels} & {\bf Scope:} shared from ADMBASE & INT \\\hline
\end{tabular*}

\vspace{0.5cm}\parskip = 10pt 
