
\section{Interfaces} 


\parskip = 0pt

\vspace{3mm} \subsection*{General}

\noindent {\bf Implements}: 

meudon\_bin\_ns
\vspace{2mm}

\noindent {\bf Inherits}: 

grid

summationbyparts

admbase

hydrobase
\vspace{2mm}
\subsection*{Grid Variables}
\vspace{5mm}\subsubsection{PUBLIC GROUPS}

\vspace{5mm}

\begin{tabular*}{150mm}{|c|c@{\extracolsep{\fill}}|rl|} \hline 
~ {\bf Group Names} ~ & ~ {\bf Variable Names} ~  &{\bf Details} ~ & ~\\ 
\hline 
init\_eos\_key & init\_eos\_key & compact & 0 \\ 
 &  & description & Initial data eos handle for EOS\_Omni \\ 
 &  & dimensions & 0 \\ 
 &  & distribution & CONSTANT \\ 
 &  & group type & SCALAR \\ 
 &  & timelevels & 1 \\ 
 &  & variable type & INT \\ 
\hline 
\end{tabular*} 



\vspace{5mm}\parskip = 10pt 
