
\section{Parameters} 


\parskip = 0pt

\setlength{\tableWidth}{160mm}

\setlength{\paraWidth}{\tableWidth}
\setlength{\descWidth}{\tableWidth}
\settowidth{\maxVarWidth}{eos\_table\_filepath}

\addtolength{\paraWidth}{-\maxVarWidth}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}

\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{eos\_precision} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em precision of EOS calculations in EOSOmni}} \\
\hline{\bf Range} & &  {\bf Default:} 1.e-8 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{any positive number} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{eos\_table} & {\bf Scope:} private & STRING \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Initial data EOS identifyer}} \\
\hline{\bf Range} & &  {\bf Default:} 2D\_Polytrope \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering } & \multicolumn{2}{p{\paraWidth}|}{Any valid EOS name in EOSOmni} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{eos\_table\_filepath} & {\bf Scope:} private & STRING \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Directory containing the EOS file used to generate the initial data}} \\
\hline{\bf Range} & &  {\bf Default:} (none) \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering } & \multicolumn{2}{p{\paraWidth}|}{Directory name, default (empty string) is 'do not tell Lorene to overwrite info found in Lorene data'} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{filename} & {\bf Scope:} private & STRING \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Input file name containing LORENE data}} \\
\hline{\bf Range} & &  {\bf Default:} (none) \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering } & \multicolumn{2}{p{\paraWidth}|}{Any filename, potentially including path} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{recalculate\_eps} & {\bf Scope:} private & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Should eps be recalculated (default), or taken from Lorene data?}} \\
\hline & & {\bf Default:} yes \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{initial\_hydro} & {\bf Scope:} shared from HYDROBASE & KEYWORD \\\hline
\multicolumn{3}{|l|}{\bf Extends ranges:}\\ 
\hline\multicolumn{1}{|p{\maxVarWidth}|}{\centering Meudon\_Bin\_NS} & \multicolumn{2}{p{\paraWidth}|}{LORENE Binary Neutron Star initial data} \\\hline
\end{tabular*}

\vspace{0.5cm}\parskip = 10pt 
