
\section{Interfaces} 


\parskip = 0pt

\vspace{3mm} \subsection*{General}

\noindent {\bf Implements}: 

grhydro\_init\_data
\vspace{2mm}

\noindent {\bf Inherits}: 

grhydro

grid

eos\_omni
\vspace{2mm}
\subsection*{Grid Variables}
\vspace{5mm}\subsubsection{PRIVATE GROUPS}

\vspace{5mm}

\begin{tabular*}{150mm}{|c|c@{\extracolsep{\fill}}|rl|} \hline 
~ {\bf Group Names} ~ & ~ {\bf Variable Names} ~  &{\bf Details} ~ & ~\\ 
\hline 
grhydro\_init\_data\_reflevel & GRHydro\_init\_data\_reflevel & compact & 0 \\ 
 &  & description & Refinement level GRHydro is working on right now \\ 
 &  & dimensions & 0 \\ 
 &  & distribution & CONSTANT \\ 
 &  & group type & SCALAR \\ 
 &  & tags & checkpoint="no" \\ 
 &  & timelevels & 1 \\ 
 &  & variable type & INT \\ 
\hline 
\end{tabular*} 


\vspace{5mm}\subsubsection{PROTECTED GROUPS}

\vspace{5mm}

\begin{tabular*}{150mm}{|c|c@{\extracolsep{\fill}}|rl|} \hline 
~ {\bf Group Names} ~ & ~ {\bf Variable Names} ~  &{\bf Details} ~ & ~\\ 
\hline 
simple\_wave\_grid\_functions &  & compact & 0 \\ 
 & simple\_tmp & description & 1D arrays for the simple-wave routine \\ 
 & c\_s & dimensions & 3 \\ 
 &  & distribution & DEFAULT \\ 
 &  & group type & GF \\ 
 &  & tags & checkpoint="no" \\ 
 &  & timelevels & 1 \\ 
 &  & variable type & REAL \\ 
\hline 
simple\_wave\_scalars &  & compact & 0 \\ 
 & simple\_rho\_0 & description & values at v=0 \\ 
 & simple\_eps\_0 & dimensions & 0 \\ 
 &  & distribution & CONSTANT \\ 
 &  & group type & SCALAR \\ 
 &  & timelevels & 1 \\ 
 &  & variable type & REAL \\ 
\hline 
simple\_wave\_output &  & compact & 0 \\ 
 & simple\_rho & description & output variables for the simple-wave routine \\ 
 & simple\_eps & dimensions & 3 \\ 
 &  & distribution & DEFAULT \\ 
 &  & group type & GF \\ 
 &  & tags & checkpoint="no" \\ 
 &  & timelevels & 1 \\ 
 &  & variable type & REAL \\ 
\hline 
\end{tabular*} 



\vspace{5mm}

\noindent {\bf Uses header}: 

SpaceMask.h
\vspace{2mm}\parskip = 10pt 
