
\section{Schedule} 


\parskip = 0pt


\noindent This section lists all the variables which are assigned storage by thorn EinsteinEOS/EOS\_Omni.  Storage can either last for the duration of the run ({\bf Always} means that if this thorn is activated storage will be assigned, {\bf Conditional} means that if this thorn is activated storage will be assigned for the duration of the run if some condition is met), or can be turned on for the duration of a schedule function.


\subsection*{Storage}NONE
\subsection*{Scheduled Functions}
\vspace{5mm}

\noindent {\bf CCTK\_STARTUP} 

\hspace{5mm} eos\_omni\_startup 

\hspace{5mm}{\it set up conversion factors and other fun stuff } 


\hspace{5mm}

 \begin{tabular*}{160mm}{cll} 
~ & Language:  & fortran \\ 
~ & Options:  & global \\ 
~ & Type:  & function \\ 
\end{tabular*} 


\vspace{5mm}

\noindent {\bf CCTK\_BASEGRID}   (conditional) 

\hspace{5mm} nuc\_eos\_readtable\_cactus\_wrapper 

\hspace{5mm}{\it read eos hdf5 table } 


\hspace{5mm}

 \begin{tabular*}{160mm}{cll} 
~ & Language:  & c \\ 
~ & Options:  & global \\ 
~ & Type:  & function \\ 
\end{tabular*} 


\vspace{5mm}

\noindent {\bf CCTK\_BASEGRID}   (conditional) 

\hspace{5mm} eos\_omni\_get\_energy\_shift 

\hspace{5mm}{\it setup energy\_shift in eos\_omni\_module } 


\hspace{5mm}

 \begin{tabular*}{160mm}{cll} 
~ & After:  & nuc\_eos\_readtable\_cactus\_wrapper \\ 
~ & Language:  & fortran \\ 
~ & Options:  & global \\ 
~ & Type:  & function \\ 
\end{tabular*} 


\vspace{5mm}

\noindent {\bf CCTK\_BASEGRID}   (conditional) 

\hspace{5mm} eos\_omni\_dumptable 

\hspace{5mm}{\it dump eos hdf5 table in ascii } 


\hspace{5mm}

 \begin{tabular*}{160mm}{cll} 
~ & After:  & nuc\_eos\_readtable\_cactus\_wrapper \\ 
~ & Language:  & c \\ 
~ & Options:  & global \\ 
~ & Type:  & function \\ 
\end{tabular*} 


\vspace{5mm}

\noindent {\bf CCTK\_BASEGRID}   (conditional) 

\hspace{5mm} eos\_omni\_readcoldtable 

\hspace{5mm}{\it read cold eos ascii table } 


\hspace{5mm}

 \begin{tabular*}{160mm}{cll} 
~ & Language:  & fortran \\ 
~ & Options:  & global \\ 
~ & Type:  & function \\ 
\end{tabular*} 


\vspace{5mm}

\noindent {\bf CCTK\_BASEGRID}   (conditional) 

\hspace{5mm} eos\_omni\_barotropicreadtable 

\hspace{5mm}{\it read barotropic eos ascii table } 


\hspace{5mm}

 \begin{tabular*}{160mm}{cll} 
~ & Language:  & fortran \\ 
~ & Options:  & global \\ 
~ & Type:  & function \\ 
\end{tabular*} 



\vspace{5mm}\parskip = 10pt 
