
\section{Parameters} 


\parskip = 0pt

\setlength{\tableWidth}{160mm}

\setlength{\paraWidth}{\tableWidth}
\setlength{\descWidth}{\tableWidth}
\settowidth{\maxVarWidth}{barotropiceos\_use\_thermal\_gamma\_law}

\addtolength{\paraWidth}{-\maxVarWidth}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}

\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{barotropiceos\_gammath} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em thermal gamma for barotropic EOS}} \\
\hline{\bf Range} & &  {\bf Default:} 2.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 1.0:*} & \multicolumn{2}{p{\paraWidth}|}{something} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{barotropiceos\_read\_table} & {\bf Scope:} restricted & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Read in barotropic EOS table?}} \\
\hline & & {\bf Default:} No \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{barotropiceos\_table\_name} & {\bf Scope:} restricted & STRING \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em table name for barotropic EOS (ASCII)}} \\
\hline{\bf Range} & &  {\bf Default:} blah.asc \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering .+} & \multicolumn{2}{p{\paraWidth}|}{Can be anything} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{barotropiceos\_use\_thermal\_gamma\_law} & {\bf Scope:} restricted & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em use an additional thermal gamma?}} \\
\hline & & {\bf Default:} Yes \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{coldeos\_read\_table} & {\bf Scope:} restricted & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Read in cold EOS table?}} \\
\hline & & {\bf Default:} No \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{coldeos\_table\_name} & {\bf Scope:} restricted & STRING \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em table name for cold EOS (ASCII)}} \\
\hline{\bf Range} & &  {\bf Default:} blah.asc \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering .+} & \multicolumn{2}{p{\paraWidth}|}{Can be anything} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{coldeos\_use\_thermal\_gamma\_law} & {\bf Scope:} restricted & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em use an additional thermal gamma?}} \\
\hline & & {\bf Default:} Yes \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{do\_energy\_shift} & {\bf Scope:} restricted & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em shift energies around?}} \\
\hline & & {\bf Default:} yes \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{dump\_nuceos\_table} & {\bf Scope:} restricted & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Dump table in ASCII at beginning}} \\
\hline & & {\bf Default:} No \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{dump\_nuceos\_table\_name} & {\bf Scope:} restricted & STRING \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em nuceos dump table name (ASCII)}} \\
\hline{\bf Range} & &  {\bf Default:} blah.asc \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering .+} & \multicolumn{2}{p{\paraWidth}|}{Can be anything} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{gl\_gamma} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Adiabatic Index for gamma-law EOS}} \\
\hline{\bf Range} & &  {\bf Default:} 2.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering (0:*} & \multicolumn{2}{p{\paraWidth}|}{any positive number} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{gl\_k} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Polytropic constant in c=G=Msun=1 for gamma-law EOS}} \\
\hline{\bf Range} & &  {\bf Default:} 100.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering (0:*} & \multicolumn{2}{p{\paraWidth}|}{any positive number} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{hybrid\_gamma} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Adiabatic index of each piece}} \\
\hline{\bf Range} & &  {\bf Default:} 0.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering } & \multicolumn{2}{p{\paraWidth}|}{unset} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering (0:*} & \multicolumn{2}{p{\paraWidth}|}{Any positive} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{hybrid\_gamma1} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em subnuclear adiabatic Index for hybrid EOS}} \\
\hline{\bf Range} & &  {\bf Default:} 1.325 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering (0:*} & \multicolumn{2}{p{\paraWidth}|}{Any positive} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{hybrid\_gamma2} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em subnuclear adiabatic Index for hybrid EOS}} \\
\hline{\bf Range} & &  {\bf Default:} 2.5 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering (0:*} & \multicolumn{2}{p{\paraWidth}|}{Any positive} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{hybrid\_gamma\_th} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Thermal gamma for hybrid EOS}} \\
\hline{\bf Range} & &  {\bf Default:} 1.5 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering (0:*} & \multicolumn{2}{p{\paraWidth}|}{any positive number} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{hybrid\_k0} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em K coefficent of the first piece}} \\
\hline{\bf Range} & &  {\bf Default:} 0.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering } & \multicolumn{2}{p{\paraWidth}|}{unset} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering (0:*} & \multicolumn{2}{p{\paraWidth}|}{Any positive} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{hybrid\_k1} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Polytropic constant in c=G=Msun=1 for hybrid EOS}} \\
\hline{\bf Range} & &  {\bf Default:} 0.4640517 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering (0:*} & \multicolumn{2}{p{\paraWidth}|}{Any positive} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{hybrid\_rho} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Density values at separation points}} \\
\hline{\bf Range} & &  {\bf Default:} 0.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering } & \multicolumn{2}{p{\paraWidth}|}{unset} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering (0:*} & \multicolumn{2}{p{\paraWidth}|}{Any positive} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{hybrid\_rho\_nuc} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Density at which to switch between gammas; c=G=Msun=1}} \\
\hline{\bf Range} & &  {\bf Default:} 3.238607e-4 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering (0:*} & \multicolumn{2}{p{\paraWidth}|}{Any positive} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{n\_pieces} & {\bf Scope:} restricted & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Number of polytropic pieces}} \\
\hline{\bf Range} & &  {\bf Default:} 2 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 1:10} & \multicolumn{2}{p{\paraWidth}|}{Max 10 pieces} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{nuceos\_read\_table} & {\bf Scope:} restricted & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Read in EOS table?}} \\
\hline & & {\bf Default:} No \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{nuceos\_table\_name} & {\bf Scope:} restricted & STRING \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em nuceos table name (hdf5)}} \\
\hline{\bf Range} & &  {\bf Default:} blah.h5 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering .+} & \multicolumn{2}{p{\paraWidth}|}{Can be anything} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{poly\_gamma} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Adiabatic Index for poly EOS}} \\
\hline{\bf Range} & &  {\bf Default:} 2.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering (0:*} & \multicolumn{2}{p{\paraWidth}|}{any positive number} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{poly\_gamma\_initial} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Initial Adiabatic Index for poly and hybrid EOS}} \\
\hline{\bf Range} & &  {\bf Default:} -1 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering -1} & \multicolumn{2}{p{\paraWidth}|}{"use poly\_gamma/hybrid\_ga 
mma, ie no change in gamma during ID"} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering (0:*} & \multicolumn{2}{p{\paraWidth}|}{assume that ID used this adiabiatic index, change K accordingly} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{poly\_k} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Polytropic constant in c=G=Msun=1}} \\
\hline{\bf Range} & &  {\bf Default:} 100.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering :} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{read\_table\_on\_single\_process} & {\bf Scope:} restricted & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em read table on one process only and bcast data}} \\
\hline & & {\bf Default:} no \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{reader\_process} & {\bf Scope:} restricted & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em read table on this process and bcast data}} \\
\hline{\bf Range} & &  {\bf Default:} (none) \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{read on process N} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{out\_dir} & {\bf Scope:} shared from IO & STRING \\\hline
\end{tabular*}

\vspace{0.5cm}\parskip = 10pt 
