
\section{Parameters} 


\parskip = 0pt

\setlength{\tableWidth}{160mm}

\setlength{\paraWidth}{\tableWidth}
\setlength{\descWidth}{\tableWidth}
\settowidth{\maxVarWidth}{eos\_gamma\_supernuclear}

\addtolength{\paraWidth}{-\maxVarWidth}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}

\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{eos\_gamma\_supernuclear} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Gamma\_2 for EOS}} \\
\hline{\bf Range} & &  {\bf Default:} 1.66666666666666 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering :} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{eos\_gamma\_th} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Gamma\_th for EOS}} \\
\hline{\bf Range} & &  {\bf Default:} 1.5 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering :} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{rho\_nuc} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Nuclear matter density}} \\
\hline{\bf Range} & &  {\bf Default:} 1.e-10 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering :} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{eos\_gamma} & {\bf Scope:} shared from EOS\_2D\_POLYTROPE & REAL \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{eos\_k} & {\bf Scope:} shared from EOS\_2D\_POLYTROPE & REAL \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{gamma\_ini} & {\bf Scope:} shared from EOS\_2D\_POLYTROPE & REAL \\\hline
\end{tabular*}

\vspace{0.5cm}\parskip = 10pt 
