
\section{Parameters} 


\parskip = 0pt

\setlength{\tableWidth}{160mm}

\setlength{\paraWidth}{\tableWidth}
\setlength{\descWidth}{\tableWidth}
\settowidth{\maxVarWidth}{conformal\_storage}

\addtolength{\paraWidth}{-\maxVarWidth}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}

\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{conformal\_storage} & {\bf Scope:} restricted & KEYWORD \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em How much conformal storage do we have ?}} \\
\hline{\bf Range} & &  {\bf Default:} factor+derivs+2nd derivs \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering factor} & \multicolumn{2}{p{\paraWidth}|}{Just the conformal factor} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering factor+derivs} & \multicolumn{2}{p{\paraWidth}|}{Conformal factor plus first derivatives} \\\multicolumn{1}{|p{\maxVarWidth}|}{see [1] below} & \multicolumn{2}{p{\paraWidth}|}{Conformal factor plus first and second derivatives} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent {\bf [1]} \noindent \begin{verbatim}factor+derivs+2nd derivs\end{verbatim}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{metric\_type} & {\bf Scope:} shared from ADMBASE & KEYWORD \\\hline
\multicolumn{3}{|l|}{\bf Extends ranges:}\\ 
\hline\multicolumn{1}{|p{\maxVarWidth}|}{\centering static conformal} & \multicolumn{2}{p{\paraWidth}|}{Metric is conformal with static conformal factor, extrinsic curvature is physical} \\\hline
\end{tabular*}

\vspace{0.5cm}\parskip = 10pt 
