
\section{Parameters} 


\parskip = 0pt

\setlength{\tableWidth}{160mm}

\setlength{\paraWidth}{\tableWidth}
\setlength{\descWidth}{\tableWidth}
\settowidth{\maxVarWidth}{temperature\_evolution\_method}

\addtolength{\paraWidth}{-\maxVarWidth}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}

\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{abar\_evolution\_method} & {\bf Scope:} restricted & KEYWORD \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Evolution method for Abar}} \\
\hline{\bf Range} & &  {\bf Default:} none \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering none} & \multicolumn{2}{p{\paraWidth}|}{Evolution for Abar is disabled} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{bvec\_evolution\_method} & {\bf Scope:} restricted & KEYWORD \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Evolution method for Bvec}} \\
\hline{\bf Range} & &  {\bf Default:} none \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering none} & \multicolumn{2}{p{\paraWidth}|}{Evolution for Bvec is disabled} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{entropy\_evolution\_method} & {\bf Scope:} restricted & KEYWORD \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Evolution method for entropy}} \\
\hline{\bf Range} & &  {\bf Default:} none \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering none} & \multicolumn{2}{p{\paraWidth}|}{Evolution for entropy is disabled} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{evolution\_method} & {\bf Scope:} restricted & KEYWORD \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em The hydro evolution method}} \\
\hline{\bf Range} & &  {\bf Default:} none \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering none} & \multicolumn{2}{p{\paraWidth}|}{hydro variables are not evolved} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{hydro\_excision} & {\bf Scope:} restricted & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Turn on of off (default) storage for hydro excision}} \\
\hline{\bf Range} & &  {\bf Default:} (none) \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{Anything else than 0 turns hydro\_excision on, added to by other thorns} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{initial\_abar} & {\bf Scope:} restricted & KEYWORD \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Initial value for Abar}} \\
\hline{\bf Range} & &  {\bf Default:} none \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering none} & \multicolumn{2}{p{\paraWidth}|}{inactive} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering zero} & \multicolumn{2}{p{\paraWidth}|}{initially set to zero} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering read from file} & \multicolumn{2}{p{\paraWidth}|}{Read the initial data using the IOUtil file reader.  Note that this only allows you to read the data from a file, it does not actually do it.  You still have to programme the IOUtil file reader accordingly.} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{initial\_aphi} & {\bf Scope:} restricted & KEYWORD \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Initial value for Aphi}} \\
\hline{\bf Range} & &  {\bf Default:} none \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering none} & \multicolumn{2}{p{\paraWidth}|}{inactive} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering zero} & \multicolumn{2}{p{\paraWidth}|}{initially set to zero} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering read from file} & \multicolumn{2}{p{\paraWidth}|}{Read the initial data using the IOUtil file reader.  Note that this only allows you to read the data from a file, it does not actually do it.  You still have to programme the IOUtil file reader accordingly.} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{initial\_avec} & {\bf Scope:} restricted & KEYWORD \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Initial value for Avec}} \\
\hline{\bf Range} & &  {\bf Default:} none \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering none} & \multicolumn{2}{p{\paraWidth}|}{inactive} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering zero} & \multicolumn{2}{p{\paraWidth}|}{initially set to zero} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering read from file} & \multicolumn{2}{p{\paraWidth}|}{Read the initial data using the IOUtil file reader.  Note that this only allows you to read the data from a file, it does not actually do it.  You still have to programme the IOUtil file reader accordingly.} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{initial\_bvec} & {\bf Scope:} restricted & KEYWORD \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Initial value for Bvec}} \\
\hline{\bf Range} & &  {\bf Default:} none \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering none} & \multicolumn{2}{p{\paraWidth}|}{inactive} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering zero} & \multicolumn{2}{p{\paraWidth}|}{initially set to zero} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering read from file} & \multicolumn{2}{p{\paraWidth}|}{Read the initial data using the IOUtil file reader.  Note that this only allows you to read the data from a file, it does not actually do it.  You still have to programme the IOUtil file reader accordingly.} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{initial\_entropy} & {\bf Scope:} restricted & KEYWORD \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Initial value for entropy}} \\
\hline{\bf Range} & &  {\bf Default:} none \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering none} & \multicolumn{2}{p{\paraWidth}|}{inactive} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering zero} & \multicolumn{2}{p{\paraWidth}|}{initially set to zero} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering read from file} & \multicolumn{2}{p{\paraWidth}|}{Read the initial data using the IOUtil file reader.  Note that this only allows you to read the data from a file, it does not actually do it.  You still have to programme the IOUtil file reader accordingly.} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{initial\_hydro} & {\bf Scope:} restricted & KEYWORD \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em The hydro initial data}} \\
\hline{\bf Range} & &  {\bf Default:} zero \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering zero} & \multicolumn{2}{p{\paraWidth}|}{hydro variables are set to vacuum (without atmosphere)} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering read from file} & \multicolumn{2}{p{\paraWidth}|}{Read the initial data using the IOUtil file reader.  Note that this only allows you to read the data from a file, it does not actually do it.  You still have to programme the IOUtil file reader accordingly.} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{initial\_temperature} & {\bf Scope:} restricted & KEYWORD \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Initial value for temperature}} \\
\hline{\bf Range} & &  {\bf Default:} none \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering none} & \multicolumn{2}{p{\paraWidth}|}{inactive} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering zero} & \multicolumn{2}{p{\paraWidth}|}{initially set to zero} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering read from file} & \multicolumn{2}{p{\paraWidth}|}{Read the initial data using the IOUtil file reader.  Note that this only allows you to read the data from a file, it does not actually do it.  You still have to programme the IOUtil file reader accordingly.} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{initial\_y\_e} & {\bf Scope:} restricted & KEYWORD \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Initial value for Y\_e}} \\
\hline{\bf Range} & &  {\bf Default:} none \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering none} & \multicolumn{2}{p{\paraWidth}|}{inactive} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering one} & \multicolumn{2}{p{\paraWidth}|}{initially set to one} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering read from file} & \multicolumn{2}{p{\paraWidth}|}{Read the initial data using the IOUtil file reader.  Note that this only allows you to read the data from a file, it does not actually do it.  You still have to programme the IOUtil file reader accordingly.} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{prolongation\_type} & {\bf Scope:} restricted & STRING \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em The prolongation operator used by Carpet for HydroBase variables}} \\
\hline{\bf Range} & &  {\bf Default:} ENO \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering ENO} & \multicolumn{2}{p{\paraWidth}|}{Third order ENO operators; only third order is implemented} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering WENO} & \multicolumn{2}{p{\paraWidth}|}{Fifth order WENO operators; only fifth order is implemented} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering .*} & \multicolumn{2}{p{\paraWidth}|}{Anything else} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{temperature\_evolution\_method} & {\bf Scope:} restricted & KEYWORD \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Evolution method for temperature}} \\
\hline{\bf Range} & &  {\bf Default:} none \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering none} & \multicolumn{2}{p{\paraWidth}|}{Evolution for temperature is disabled} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{timelevels} & {\bf Scope:} restricted & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Number of time levels in evolution scheme}} \\
\hline{\bf Range} & &  {\bf Default:} 1 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 1:3} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{y\_e\_evolution\_method} & {\bf Scope:} restricted & KEYWORD \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Evolution method for Y\_e}} \\
\hline{\bf Range} & &  {\bf Default:} none \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering none} & \multicolumn{2}{p{\paraWidth}|}{Evolution for Y\_e is disabled} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{filereader\_id\_vars} & {\bf Scope:} shared from IO & STRING \\\hline
\end{tabular*}

\vspace{0.5cm}\parskip = 10pt 
