
\section{Interfaces} 


\parskip = 0pt

\vspace{3mm} \subsection*{General}

\noindent {\bf Implements}: 

outflow
\vspace{2mm}

\noindent {\bf Inherits}: 

admbase

hydrobase

sphericalsurface
\vspace{2mm}
\subsection*{Grid Variables}
\vspace{5mm}\subsubsection{PRIVATE GROUPS}

\vspace{5mm}

\begin{tabular*}{150mm}{|c|c@{\extracolsep{\fill}}|rl|} \hline 
~ {\bf Group Names} ~ & ~ {\bf Variable Names} ~  &{\bf Details} ~ & ~\\ 
\hline 
outflow\_flux & outflow\_flux & compact & 0 \\ 
 &  & description & flux of mass through the detectors \\ 
 &  & dimensions & 0 \\ 
 &  & distribution & CONSTANT \\ 
 &  & group type & SCALAR \\ 
 &  & tags & checkpoint="no" \\ 
 &  & timelevels & 1 \\ 
 &  & vararray\_size & num\_detectors \\ 
 &  & variable type & REAL \\ 
\hline 
fluxdens\_projected & fluxdens\_projected & compact & 0 \\ 
 &  & description & 2D (theta \\ 
& ~ & description & phi) grid arrays for flux density \\ 
 &  & dimensions & 2 \\ 
 &  & distribution & CONSTANT \\ 
 &  & group type & ARRAY \\ 
 &  & size & SPHERICALSURFACE::MAXNTHETA \\ 
& ~ & size & SPHERICALSURFACE::MAXNPHI \\ 
 &  & tags & checkpoint="no" \\ 
 &  & timelevels & 1 \\ 
 &  & vararray\_size & num\_detectors \\ 
 &  & variable type & REAL \\ 
\hline 
w\_lorentz\_projected & w\_lorentz\_projected & compact & 0 \\ 
 &  & description & 2D (theta \\ 
& ~ & description & phi) grid arrays for Lorentz factor \\ 
 &  & dimensions & 2 \\ 
 &  & distribution & CONSTANT \\ 
 &  & group type & ARRAY \\ 
 &  & size & SPHERICALSURFACE::MAXNTHETA \\ 
& ~ & size & SPHERICALSURFACE::MAXNPHI \\ 
 &  & tags & checkpoint="no" \\ 
 &  & timelevels & 1 \\ 
 &  & vararray\_size & num\_detectors \\ 
 &  & variable type & REAL \\ 
\hline 
eninf\_projected & eninf\_projected & compact & 0 \\ 
 &  & description & 2D (theta \\ 
& ~ & description & phi) grid arrays for the specific energy at infinity \\ 
 &  & dimensions & 2 \\ 
 &  & distribution & CONSTANT \\ 
 &  & group type & ARRAY \\ 
 &  & size & SPHERICALSURFACE::MAXNTHETA \\ 
& ~ & size & SPHERICALSURFACE::MAXNPHI \\ 
 &  & tags & checkpoint="no" \\ 
 &  & timelevels & 1 \\ 
 &  & vararray\_size & num\_detectors \\ 
 &  & variable type & REAL \\ 
\hline 
surface\_projections &  & compact & 0 \\ 
 & surface\_projection\_0 & description & 2D (theta \\ 
& ~ & description & phi) grid arrays for points on the spherical surfaces \\ 
 & surface\_projection\_1 & dimensions & 2 \\ 
 & surface\_projection\_2 & distribution & CONSTANT \\ 
 & surface\_projection\_3 & group type & ARRAY \\ 
 & surface\_projection\_4 & size & SPHERICALSURFACE::MAXNTHETA \\ 
& ~ & size & SPHERICALSURFACE::MAXNPHI \\ 
 & surface\_projection\_5 & tags & checkpoint="no" \\ 
 & surface\_projection\_6 & timelevels & 1 \\ 
 & surface\_projection\_7 & vararray\_size & num\_detectors \\ 
 & surface\_projection\_8 & variable type & REAL \\ 
\hline 
\end{tabular*} 



\vspace{5mm}\parskip = 10pt 
