
\section{Parameters} 


\parskip = 0pt

\setlength{\tableWidth}{160mm}

\setlength{\paraWidth}{\tableWidth}
\setlength{\descWidth}{\tableWidth}
\settowidth{\maxVarWidth}{hydro\_analysis\_rho\_max\_loc\_use\_rotatingsymmetry180}

\addtolength{\paraWidth}{-\maxVarWidth}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}

\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{hydro\_analysis\_average\_multiple\_maxima\_locations} & {\bf Scope:} private & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em when finding more than one global maximum location, average position and use result}} \\
\hline & & {\bf Default:} false \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{hydro\_analysis\_comp\_core\_rho\_centroid} & {\bf Scope:} private & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em compute location of the centroid of rho*x in region r\_core around densest point}} \\
\hline & & {\bf Default:} no \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{hydro\_analysis\_comp\_rho\_max} & {\bf Scope:} private & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Look for the value and location of the maximum of rho}} \\
\hline & & {\bf Default:} false \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{hydro\_analysis\_comp\_rho\_max\_every} & {\bf Scope:} private & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em How often to look  for the value and location of the maximum of rho}} \\
\hline{\bf Range} & &  {\bf Default:} 1 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:0} & \multicolumn{2}{p{\paraWidth}|}{Never} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 1:*} & \multicolumn{2}{p{\paraWidth}|}{every so often} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{hydro\_analysis\_comp\_rho\_max\_origin\_distance} & {\bf Scope:} private & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Look for the proper distance between the maximum of the density and the origin (along a straight coordinate line)}} \\
\hline & & {\bf Default:} false \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{hydro\_analysis\_comp\_vol\_weighted\_center\_of\_mass} & {\bf Scope:} private & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Look for the location of the volume-weighted center of mass}} \\
\hline & & {\bf Default:} false \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{hydro\_analysis\_core\_rho\_rel\_min} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em only include points where rho{\textgreater}rho\_rel\_min*rho\_max when computing centroid of rho*x around densest point}} \\
\hline{\bf Range} & &  {\bf Default:} 0.01 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{any positive value. For best results should be such that the region selected is smaller than r\_core. 1/10 of rho\_max should be fine.} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{hydro\_analysis\_interpolator\_coordinates} & {\bf Scope:} private & STRING \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Coordinate system}} \\
\hline{\bf Range} & &  {\bf Default:} cart3d \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering .*} & \multicolumn{2}{p{\paraWidth}|}{must be a registered coordinate system} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{hydro\_analysis\_interpolator\_name} & {\bf Scope:} private & STRING \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Name of the interpolator}} \\
\hline{\bf Range} & &  {\bf Default:} uniform cartesian \\\multicolumn{1}{|p{\maxVarWidth}|}{see [1] below} & \multicolumn{2}{p{\paraWidth}|}{from AEILocalInterp} \\\multicolumn{1}{|p{\maxVarWidth}|}{see [1] below} & \multicolumn{2}{p{\paraWidth}|}{from AEILocalInterp} \\\multicolumn{1}{|p{\maxVarWidth}|}{see [1] below} & \multicolumn{2}{p{\paraWidth}|}{from AEILocalInterp} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering uniform cartesian} & \multicolumn{2}{p{\paraWidth}|}{from LocalInterp} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering .*} & \multicolumn{2}{p{\paraWidth}|}{must be a registered interpolator} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent {\bf [1]} \noindent \begin{verbatim}Lagrange polynomial interpolation (tensor product)\end{verbatim}\noindent {\bf [1]} \noindent \begin{verbatim}Lagrange polynomial interpolation (maximum degree)\end{verbatim}\noindent {\bf [1]} \noindent \begin{verbatim}Hermite polynomial interpolation\end{verbatim}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{hydro\_analysis\_interpolator\_options} & {\bf Scope:} private & STRING \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Options for the interpolator}} \\
\hline{\bf Range} & &  {\bf Default:} order=2 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering .*} & \multicolumn{2}{p{\paraWidth}|}{must be a valid option specification} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{hydro\_analysis\_r\_core} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em size of region around densest point in which to compute the centroid of rho*x}} \\
\hline{\bf Range} & &  {\bf Default:} 4.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{any positive radius. suggested is 1/2 of stellar radius} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{hydro\_analysis\_rho\_max\_loc\_only\_positive\_x} & {\bf Scope:} private & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Restrict location search for density maximum to positive values of x}} \\
\hline & & {\bf Default:} false \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{hydro\_analysis\_rho\_max\_loc\_use\_rotatingsymmetry180} & {\bf Scope:} private & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Map found maxima into positive x half-plane assuming pi-symmetry}} \\
\hline & & {\bf Default:} false \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{hydro\_analysis\_rho\_max\_origin\_distance\_npoints} & {\bf Scope:} private & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Number of points along the straight line for measuring proper distance}} \\
\hline{\bf Range} & &  {\bf Default:} 100 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 1:*} & \multicolumn{2}{p{\paraWidth}|}{Any positive number} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{verbosity\_level} & {\bf Scope:} private & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em how much information to ouptut to the logs}} \\
\hline{\bf Range} & &  {\bf Default:} 1 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering } & \multicolumn{2}{p{\paraWidth}|}{Output nothing} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 1} & \multicolumn{2}{p{\paraWidth}|}{warn when finding multiple maxima} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 2} & \multicolumn{2}{p{\paraWidth}|}{also output location of maxima} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{restmass\_compute\_masses} & {\bf Scope:} restricted & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Should we compute the masses?}} \\
\hline & & {\bf Default:} no \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{restmass\_masses\_nr} & {\bf Scope:} restricted & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em number of radii within which to compute the rest mass}} \\
\hline{\bf Range} & &  {\bf Default:} (none) \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:100} & \multicolumn{2}{p{\paraWidth}|}{Positive and hard-limited} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{restmass\_ref\_radius\_mass} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Radii within which mass will be computed}} \\
\hline{\bf Range} & &  {\bf Default:} 10.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0.0:} & \multicolumn{2}{p{\paraWidth}|}{Positive} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{restmass\_rho\_min} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Points with rest-mass density below this value are excluded (it could be set equal to the atmosphere value)}} \\
\hline{\bf Range} & &  {\bf Default:} 1.e-9 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{timelevels} & {\bf Scope:} shared from HYDROBASE & INT \\\hline
\end{tabular*}

\vspace{0.5cm}\parskip = 10pt 
