
\section{Parameters} 


\parskip = 0pt

\setlength{\tableWidth}{160mm}

\setlength{\paraWidth}{\tableWidth}
\setlength{\descWidth}{\tableWidth}
\settowidth{\maxVarWidth}{admmass\_use\_surface\_distance\_as\_volume\_radius}

\addtolength{\paraWidth}{-\maxVarWidth}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}

\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{admmass\_debug} & {\bf Scope:} private & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Enable some info at runtime}} \\
\hline & & {\bf Default:} no \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{admmass\_distance\_from\_grid\_boundary} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em distance between the grid boundaries and the surface of the integration box}} \\
\hline{\bf Range} & &  {\bf Default:} -1.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering :} & \multicolumn{2}{p{\paraWidth}|}{{\textless}=0 for disable, positive otherwise} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{admmass\_excise\_horizons} & {\bf Scope:} private & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Should we exclude the region inside the AH to the volume integral}} \\
\hline & & {\bf Default:} no \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{admmass\_number} & {\bf Scope:} private & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em number of measurements}} \\
\hline{\bf Range} & &  {\bf Default:} 1 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:} & \multicolumn{2}{p{\paraWidth}|}{0 or positive} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{admmass\_surface\_distance} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em distance between the above-defined center of the integration (cubic) box and its surface}} \\
\hline{\bf Range} & &  {\bf Default:} -1.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering :} & \multicolumn{2}{p{\paraWidth}|}{{\textless}=0 for disable, positive otherwise} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{admmass\_use\_all\_volume\_as\_volume\_radius} & {\bf Scope:} private & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Use the whole grid for volume integration}} \\
\hline & & {\bf Default:} no \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{admmass\_use\_surface\_distance\_as\_volume\_radius} & {\bf Scope:} private & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Use ADMMass\_surface\_distance instead of ADMMass\_volume\_radius}} \\
\hline & & {\bf Default:} yes \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{admmass\_volume\_radius} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em radius of the sphere inside which the volume integral is computed}} \\
\hline{\bf Range} & &  {\bf Default:} -1.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering :} & \multicolumn{2}{p{\paraWidth}|}{{\textless}=0 for disable, positive otherwise} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{admmass\_x\_max} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em x position of the righttmost yz-plane for the integration box}} \\
\hline{\bf Range} & &  {\bf Default:} 100.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering :} & \multicolumn{2}{p{\paraWidth}|}{anything} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{admmass\_x\_min} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em x position of the leftmost yz-plane for the integration box}} \\
\hline{\bf Range} & &  {\bf Default:} -100.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering :} & \multicolumn{2}{p{\paraWidth}|}{anything} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{admmass\_x\_pos} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em x position of the center of the integration box}} \\
\hline{\bf Range} & &  {\bf Default:} 0.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering :} & \multicolumn{2}{p{\paraWidth}|}{anything} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{admmass\_y\_max} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em y position of the rightmost xz-plane for the integration box}} \\
\hline{\bf Range} & &  {\bf Default:} 100.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering :} & \multicolumn{2}{p{\paraWidth}|}{anything} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{admmass\_y\_min} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em y position of the leftmost xz-plane for the integration box}} \\
\hline{\bf Range} & &  {\bf Default:} -100.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering :} & \multicolumn{2}{p{\paraWidth}|}{anything} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{admmass\_y\_pos} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em y position of the center of the integration box}} \\
\hline{\bf Range} & &  {\bf Default:} 0.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering :} & \multicolumn{2}{p{\paraWidth}|}{anything} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{admmass\_z\_max} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em z position of the rightmost xy-plane for the integration box}} \\
\hline{\bf Range} & &  {\bf Default:} 100.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering :} & \multicolumn{2}{p{\paraWidth}|}{anything} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{admmass\_z\_min} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em z position of the leftmost xy-plane for the integration box}} \\
\hline{\bf Range} & &  {\bf Default:} -100.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering :} & \multicolumn{2}{p{\paraWidth}|}{anything} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{admmass\_z\_pos} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em z position of the center of the integration box}} \\
\hline{\bf Range} & &  {\bf Default:} 0.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering :} & \multicolumn{2}{p{\paraWidth}|}{anything} \\\hline
\end{tabular*}

\vspace{0.5cm}\parskip = 10pt 
