
\section{Parameters} 


\parskip = 0pt

\setlength{\tableWidth}{160mm}

\setlength{\paraWidth}{\tableWidth}
\setlength{\descWidth}{\tableWidth}
\settowidth{\maxVarWidth}{conformal\_factor\_floor}

\addtolength{\paraWidth}{-\maxVarWidth}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}

\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{conformal\_factor\_floor} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em The conformal factor W will never be smaller than this value}} \\
\hline{\bf Range} & &  {\bf Default:} 1e-10 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{dissipation\_epsilon} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em The ammount of dissipation to add. Should be in the [0, 1/3[ range}} \\
\hline{\bf Range} & &  {\bf Default:} 0.2 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{eta\_b} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Mass dependent damping coefficient for the hyperbolic gamma driver shift}} \\
\hline{\bf Range} & &  {\bf Default:} 1.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{evolved\_lapse\_floor} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em The evolved lapse will never be smaller than this value}} \\
\hline{\bf Range} & &  {\bf Default:} 0.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\parskip = 10pt 
