
\section{Parameters} 


\parskip = 0pt

\setlength{\tableWidth}{160mm}

\setlength{\paraWidth}{\tableWidth}
\setlength{\descWidth}{\tableWidth}
\settowidth{\maxVarWidth}{refined\_radius}

\addtolength{\paraWidth}{-\maxVarWidth}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}

\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{deriv\_order} & {\bf Scope:} private & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Order of spatial finite differencing}} \\
\hline{\bf Range} & &  {\bf Default:} 4 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 2} & \multicolumn{2}{p{\paraWidth}|}{Second order finite difference} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 4} & \multicolumn{2}{p{\paraWidth}|}{Fourth order finite difference} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 6} & \multicolumn{2}{p{\paraWidth}|}{Sixth order finite difference} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{kxx} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em par for polynomial}} \\
\hline{\bf Range} & &  {\bf Default:} 0.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{kxy} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em par for polynomial}} \\
\hline{\bf Range} & &  {\bf Default:} 0.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{kyz} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em par for polynomial}} \\
\hline{\bf Range} & &  {\bf Default:} 0.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{refined\_radius} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em size of the refined region at the center}} \\
\hline{\bf Range} & &  {\bf Default:} 0.25 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering (0:*} & \multicolumn{2}{p{\paraWidth}|}{any positive size} \\\hline
\end{tabular*}

\vspace{0.5cm}\parskip = 10pt 
