
\section{Interfaces} 


\parskip = 0pt

\vspace{3mm} \subsection*{General}

\noindent {\bf Implements}: 

carpetxregrid
\vspace{2mm}
\subsection*{Grid Variables}
\vspace{5mm}\subsubsection{PUBLIC GROUPS}

\vspace{5mm}

\begin{tabular*}{150mm}{|c|c@{\extracolsep{\fill}}|rl|} \hline 
~ {\bf Group Names} ~ & ~ {\bf Variable Names} ~  &{\bf Details} ~ & ~\\ 
\hline 
regrid\_error &  & centering & centering=\{1 1 1\} \\ 
 & regrid\_error & compact & 0 \\ 
 &  & description & Regridding condition \\ 
 &  & dimensions & 3 \\ 
 &  & distribution & DEFAULT \\ 
 &  & group type & GF \\ 
 &  & tags & checkpoint="no" \\ 
 &  & timelevels & 1 \\ 
 &  & variable type & REAL \\ 
\hline 
\end{tabular*} 



\vspace{5mm}\parskip = 10pt 
