
\section{Parameters} 


\parskip = 0pt

\setlength{\tableWidth}{160mm}

\setlength{\paraWidth}{\tableWidth}
\setlength{\descWidth}{\tableWidth}
\settowidth{\maxVarWidth}{interpolator\_options}

\addtolength{\paraWidth}{-\maxVarWidth}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}

\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{interp\_nx} & {\bf Scope:} private & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em number of points for interpolated region}} \\
\hline{\bf Range} & &  {\bf Default:} 4 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{interp\_ny} & {\bf Scope:} private & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em number of points for interpolated region}} \\
\hline{\bf Range} & &  {\bf Default:} 4 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{interp\_nz} & {\bf Scope:} private & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em number of points for interpolated region}} \\
\hline{\bf Range} & &  {\bf Default:} 4 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{interp\_xmax} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em xmax for interpolated region}} \\
\hline{\bf Range} & &  {\bf Default:} +0.5 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{interp\_xmin} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em xmin for interpolated region}} \\
\hline{\bf Range} & &  {\bf Default:} -0.5 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{interp\_ymax} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em ymax for interpolated region}} \\
\hline{\bf Range} & &  {\bf Default:} +0.5 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{interp\_ymin} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em ymin for interpolated region}} \\
\hline{\bf Range} & &  {\bf Default:} -0.5 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{interp\_zmax} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em zmax for interpolated region}} \\
\hline{\bf Range} & &  {\bf Default:} +0.5 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{interp\_zmin} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em zmin for interpolated region}} \\
\hline{\bf Range} & &  {\bf Default:} -0.5 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{interpolator} & {\bf Scope:} private & STRING \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em The interpolator to use}} \\
\hline{\bf Range} & &  {\bf Default:} Lagrange polynomial interpolation \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering } & \multicolumn{2}{p{\paraWidth}|}{must be a registered interpolator} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{interpolator\_options} & {\bf Scope:} private & STRING \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Options for the interpolator}} \\
\hline{\bf Range} & &  {\bf Default:} order=2 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering } & \multicolumn{2}{p{\paraWidth}|}{must be a valid options specification} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{power\_t} & {\bf Scope:} private & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Polynomial power of t coordinate}} \\
\hline{\bf Range} & &  {\bf Default:} (none) \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{power\_x} & {\bf Scope:} private & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Polynomial power of x coordinate}} \\
\hline{\bf Range} & &  {\bf Default:} (none) \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{power\_y} & {\bf Scope:} private & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Polynomial power of y coordinate}} \\
\hline{\bf Range} & &  {\bf Default:} (none) \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{power\_z} & {\bf Scope:} private & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Polynomial power of z coordinate}} \\
\hline{\bf Range} & &  {\bf Default:} (none) \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{prolongation} & {\bf Scope:} private & KEYWORD \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em The prolongation operator to use}} \\
\hline{\bf Range} & &  {\bf Default:} Lagrange \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering Lagrange} & \multicolumn{2}{p{\paraWidth}|}{} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering ENO} & \multicolumn{2}{p{\paraWidth}|}{} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering WENO} & \multicolumn{2}{p{\paraWidth}|}{} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering TVD} & \multicolumn{2}{p{\paraWidth}|}{} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering Lagrange\_monotone} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\parskip = 10pt 
