
\section{Parameters} 


\parskip = 0pt

\setlength{\tableWidth}{160mm}

\setlength{\paraWidth}{\tableWidth}
\setlength{\descWidth}{\tableWidth}
\settowidth{\maxVarWidth}{extra\_dissipation\_at\_outerbound}

\addtolength{\paraWidth}{-\maxVarWidth}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}

\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{ah\_max\_epsdis} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em maximal epsdis}} \\
\hline{\bf Range} & &  {\bf Default:} -1.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{{\textless}0 for 'off', {\textgreater}=0 for maximal epsdis in horizon} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{ah\_radius\_offset} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Offset to the distance from the AH.}} \\
\hline{\bf Range} & &  {\bf Default:} 0.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{negative values shift inwards, positive outwards} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{ah\_slope} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Slope inside AH}} \\
\hline{\bf Range} & &  {\bf Default:} 0.2 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{Slope from the outside value to the inside value in AHs} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{epsdis} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Dissipation strength}} \\
\hline{\bf Range} & &  {\bf Default:} 0.2 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{0 for no dissipation.  Unstable for epsdis{\textless}0 and epsdis{\textgreater}1/3} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{epsdis\_for\_level} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Alternate epsdis for a specific refinement level}} \\
\hline{\bf Range} & &  {\bf Default:} -1.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering :} & \multicolumn{2}{p{\paraWidth}|}{Negative indicates use default} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{extra\_dissipation\_at\_outerbound} & {\bf Scope:} restricted & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em increase dissipation at outer boundary}} \\
\hline & & {\bf Default:} no \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{extra\_dissipation\_in\_horizons} & {\bf Scope:} restricted & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em extra dissipation in horizons}} \\
\hline & & {\bf Default:} no \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{horizon\_number} & {\bf Scope:} restricted & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em horizon number for extra dissipation in horizons -- AHFinderDirect number}} \\
\hline{\bf Range} & &  {\bf Default:} -1 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering -1} & \multicolumn{2}{p{\paraWidth}|}{do not use a horizon} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 1:*} & \multicolumn{2}{p{\paraWidth}|}{horizon number (from AHFinderDirect); starts from 1} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{ob\_slope} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em slope at outer boundary}} \\
\hline{\bf Range} & &  {\bf Default:} 5 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{increase dissipation} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{order} & {\bf Scope:} restricted & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Dissipation order}} \\
\hline{\bf Range} & &  {\bf Default:} 3 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 1} & \multicolumn{2}{p{\paraWidth}|}{first order accurate dissipation (using a second derivative)} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 3} & \multicolumn{2}{p{\paraWidth}|}{third order accurate dissipation (using a fourth derivative)} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 5} & \multicolumn{2}{p{\paraWidth}|}{fifth order accurate dissipation (using a sixth derivative)} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 7} & \multicolumn{2}{p{\paraWidth}|}{seventh order accurate dissipation (using an eighth derivative)} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 9} & \multicolumn{2}{p{\paraWidth}|}{ninth order accurate dissipation (using a tenth derivative)} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{outer\_bound\_npoints} & {\bf Scope:} restricted & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em number of points in which dissipation should be increased}} \\
\hline{\bf Range} & &  {\bf Default:} 3 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{positive number} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{outer\_boundary\_max\_epsdis} & {\bf Scope:} restricted & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em maximal epsdis}} \\
\hline{\bf Range} & &  {\bf Default:} -1.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{{\textless}0 for 'off', {\textgreater}=0 for maximal epsdis at the outer boundary} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{respect\_emask} & {\bf Scope:} restricted & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em respect excision mask}} \\
\hline & & {\bf Default:} no \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{surface\_number} & {\bf Scope:} restricted & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em horizon number for extra dissipation in horizons -- SphericalSurface number}} \\
\hline{\bf Range} & &  {\bf Default:} -1 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering -1} & \multicolumn{2}{p{\paraWidth}|}{do not use a spherical surface} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{surface number (from SphericalSurface); starts from 0} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{update\_ah\_every} & {\bf Scope:} restricted & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em how often to update the AH information for dissipation}} \\
\hline{\bf Range} & &  {\bf Default:} 1 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{positive iteration number} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{use\_dissipation\_near\_excision} & {\bf Scope:} restricted & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Apply excision near the excision boundary (does not work for high orders)}} \\
\hline & & {\bf Default:} yes \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{vars} & {\bf Scope:} restricted & STRING \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em List of evolved grid functions that should have dissipation added}} \\
\hline{\bf Range} & &  {\bf Default:} (none) \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering .*} & \multicolumn{2}{p{\paraWidth}|}{must be a valid list of grid functions} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{verbose} & {\bf Scope:} restricted & BOOLEAN \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em produce log output}} \\
\hline & & {\bf Default:} no \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{use\_mask} & {\bf Scope:} shared from SPACEMASK & BOOLEAN \\\hline
\end{tabular*}

\vspace{0.5cm}\parskip = 10pt 
