
\section{Parameters} 


\parskip = 0pt

\setlength{\tableWidth}{160mm}

\setlength{\paraWidth}{\tableWidth}
\setlength{\descWidth}{\tableWidth}
\settowidth{\maxVarWidth}{amplitude}

\addtolength{\paraWidth}{-\maxVarWidth}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}

\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{amplitude} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Amplitude of initial Gaussian wave}} \\
\hline{\bf Range} & &  {\bf Default:} 1.0 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{bound} & {\bf Scope:} private & KEYWORD \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Which boundary condition to apply}} \\
\hline{\bf Range} & &  {\bf Default:} zero \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering zero} & \multicolumn{2}{p{\paraWidth}|}{Set boundary values to zero} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering radiation} & \multicolumn{2}{p{\paraWidth}|}{Radiation/wave boundary conditions} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering none} & \multicolumn{2}{p{\paraWidth}|}{Don't apply any condition} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{center} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em x-position of center of Gaussian wave}} \\
\hline{\bf Range} & &  {\bf Default:} 0.5 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{Anywhere} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{sigma} & {\bf Scope:} private & REAL \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Width of Gaussian wave}} \\
\hline{\bf Range} & &  {\bf Default:} 0.02 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering *:*} & \multicolumn{2}{p{\paraWidth}|}{Anything} \\\hline
\end{tabular*}

\vspace{0.5cm}\parskip = 10pt 
