
\section{Parameters} 


\parskip = 0pt

\setlength{\tableWidth}{160mm}

\setlength{\paraWidth}{\tableWidth}
\setlength{\descWidth}{\tableWidth}
\settowidth{\maxVarWidth}{strict\_io\_parameter\_check}

\addtolength{\paraWidth}{-\maxVarWidth}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}
\addtolength{\paraWidth}{-\columnsep}

\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\addtolength{\descWidth}{-\columnsep}
\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{out\_every} & {\bf Scope:} private & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em How often to do SampleIO output, overrides IO::out\_every}} \\
\hline{\bf Range} & &  {\bf Default:} -1 \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 1:*} & \multicolumn{2}{p{\paraWidth}|}{Every so many iterations} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:} & \multicolumn{2}{p{\paraWidth}|}{Disable SampleIO output} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering -1:} & \multicolumn{2}{p{\paraWidth}|}{Choose the default from IO::out\_every} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{out\_vars} & {\bf Scope:} private & STRING \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em Variables to output by SampleIO}} \\
\hline{\bf Range} & &  {\bf Default:} (none) \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering .+} & \multicolumn{2}{p{\paraWidth}|}{Space-separated list of fully qualified variable/group names} \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering \^\$} & \multicolumn{2}{p{\paraWidth}|}{An empty string to output nothing} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{point\_x} & {\bf Scope:} private & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em x-index (starting from 0) locating the array element to output}} \\
\hline{\bf Range} & &  {\bf Default:} (none) \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{An index between [0, nx)} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{point\_y} & {\bf Scope:} private & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em y-index (starting from 0) locating the array element to output}} \\
\hline{\bf Range} & &  {\bf Default:} (none) \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{An index between [0, ny)} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{point\_z} & {\bf Scope:} private & INT \\\hline
\multicolumn{3}{|p{\descWidth}|}{{\bf Description:}   {\em z-index (starting from 0) locating the array element to output}} \\
\hline{\bf Range} & &  {\bf Default:} (none) \\\multicolumn{1}{|p{\maxVarWidth}|}{\centering 0:*} & \multicolumn{2}{p{\paraWidth}|}{An index between [0, nz)} \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{io\_out\_every} & {\bf Scope:} shared from IO & INT \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{strict\_io\_parameter\_check} & {\bf Scope:} shared from IO & BOOLEAN \\\hline
\end{tabular*}

\vspace{0.5cm}\noindent \begin{tabular*}{\tableWidth}{|c|l@{\extracolsep{\fill}}r|}
\hline
\multicolumn{1}{|p{\maxVarWidth}}{verbose} & {\bf Scope:} shared from IO & KEYWORD \\\hline
\end{tabular*}

\vspace{0.5cm}\parskip = 10pt 
